From a3c86dbdff661303a5b3e1957f485eca2eae2414 Mon Sep 17 00:00:00 2001
From: Bertrand Yuan <189593334+bertyuan@users.noreply.github.com>
Date: Tue, 7 Apr 2026 11:24:26 +0800
Subject: Revert "A small portion of newly added unit testing code"

---
 src/components/ui/input.test.tsx | 16 ----------------
 1 file changed, 16 deletions(-)

(limited to 'src/components/ui/input.test.tsx')

diff --git a/src/components/ui/input.test.tsx b/src/components/ui/input.test.tsx
index 036352b..aabe76f 100644
--- a/src/components/ui/input.test.tsx
+++ b/src/components/ui/input.test.tsx
@@ -1,8 +1,6 @@
 import { render, screen } from '@testing-library/react';
 import { describe, expect, test } from 'vitest';
 import { Input } from './input';
-import userEvent from '@testing-library/user-event';
-import { vi } from 'vitest';
 
 describe('Input', () => {
   test('renders an input with the expected slot attribute', () => {
@@ -20,19 +18,5 @@ describe('Input', () => {
     expect(input).toHaveAttribute('type', 'password');
     expect(input).toBeDisabled();
   });
-
-  test('handles user typing and triggers onChange event', async () => {
-    const user = userEvent.setup();
-    const handleChange = vi.fn();
-
-    render(<Input aria-label="Username" onChange={handleChange} />);
-    const input = screen.getByLabelText('Username');
-
-    await user.type(input, 'hello world');
-
-    expect(input).toHaveValue('hello world');
-    expect(handleChange).toHaveBeenCalled();
-    expect(handleChange).toHaveBeenCalledTimes(11);
-  });
 });
 
-- 
cgit v1.2.3

